Main web track results — University of Waterloo MultiText project

Summary Statistics Run Number uwmt9w10g2 Run Description Automatic, content-link, title only Number of Topics 50 Total number of documents over all topics Retrieved: 45636 Relevant: 2617 Rel-ret: 1325

Recall Level Precision Averages Recall Precision 0.00 0.4594 0.10 0.3407 0.20 0.2532 0.30 0.2232 0.40 0.1766 0.50 0.1515 0.60 0.1312 0.70 0.0996 0.80 0.0681 0.90 0.0617 1.00 0.0328 Average precision over all relevant docs non-interpolated 0.1631

Document Level Averages Precision At 5 docs 0.2840 At 10 docs 0.2360 At 15 docs 0.2053 At 20 docs 0.1920 At 30 docs 0.1607 At 100 docs 0.1078 At 200 docs 0.0851 At 500 docs 0.0455 At 1000 docs 0.0265 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1833