Main web track results — Justsystem Corporation

Summary Statistics Run Number jscbt9wll1 Run Description Automatic, content-link, title+desc+narr Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2617 Rel-ret: 1916

Recall Level Precision Averages Recall Precision 0.00 0.6230 0.10 0.5123 0.20 0.4089 0.30 0.3693 0.40 0.3035 0.50 0.2763 0.60 0.2232 0.70 0.1753 0.80 0.1249 0.90 0.0832 1.00 0.0430 Average precision over all relevant docs non-interpolated 0.2659

Document Level Averages Precision At 5 docs 0.3880 At 10 docs 0.3440 At 15 docs 0.3067 At 20 docs 0.2920 At 30 docs 0.2580 At 100 docs 0.1680 At 200 docs 0.1198 At 500 docs 0.0663 At 1000 docs 0.0383 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2812