Main web track results — IIT/AAT/NCR

Summary Statistics Run Number iit00m Run Description Manual Number of Topics 50 Total number of documents over all topics Retrieved: 25956 Relevant: 2617 Rel-ret: 1617

Recall Level Precision Averages Recall Precision 0.00 0.8073 0.10 0.6606 0.20 0.5366 0.30 0.4753 0.40 0.3963 0.50 0.3570 0.60 0.2702 0.70 0.2160 0.80 0.1806 0.90 0.1303 1.00 0.0717 Average precision over all relevant docs non-interpolated 0.3519

Document Level Averages Precision At 5 docs 0.5920 At 10 docs 0.5180 At 15 docs 0.4547 At 20 docs 0.4090 At 30 docs 0.3440 At 100 docs 0.1922 At 200 docs 0.1207 At 500 docs 0.0586 At 1000 docs 0.0323 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.3708