Main web track results — Johns Hopkins University, APL

Summary Statistics Run Number apl9td Run Description Automatic, content-only, title+desc Number of Topics 50 Total number of documents over all topics Retrieved: 50000 Relevant: 2617 Rel-ret: 1535

Recall Level Precision Averages Recall Precision 0.00 0.6057 0.10 0.4046 0.20 0.3062 0.30 0.2510 0.40 0.1920 0.50 0.1764 0.60 0.1414 0.70 0.1057 0.80 0.0733 0.90 0.0552 1.00 0.0385 Average precision over all relevant docs non-interpolated 0.1917

Document Level Averages Precision At 5 docs 0.3400 At 10 docs 0.2940 At 15 docs 0.2480 At 20 docs 0.2240 At 30 docs 0.1940 At 100 docs 0.1248 At 200 docs 0.0933 At 500 docs 0.0516 At 1000 docs 0.0307 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2127