Filtering track results — Informatique-CDC, DTA Routing runs

Run S2RNr1 Sub task routing Query construction automatic .M field used? no TREC data used in training? yes non-TREC data used ? no Optimized for Average Precision Topic set OHSU Total retrieved: 63000 Total relevant: 3205 Total rels retrieved: 2837

Interpolated Recall-Precision Averages Recall Precision 0.00 0.7948 0.10 0.6667 0.20 0.5272 0.30 0.4529 0.40 0.3845 0.50 0.3185 0.60 0.2737 0.70 0.2338 0.80 0.1704 0.90 0.1049 1.00 0.0251 Non-interpolated average precision 0.3432 Document Level Averages Precision At 5 docs 0.5810 At 10 docs 0.5302 At 15 docs 0.4995 At 20 docs 0.4770 At 30 docs 0.4185 At 50 docs 0.3498 At 100 docs 0.2632 At 200 docs 0.1690 At 500 docs 0.0835 At 1000 docs 0.0450 R-precision 0.3652

Run S2RNr2 Sub task routing Query construction automatic .M field used? yes TREC data used in training? yes non-TREC data used ? no Optimized for Average Precision Topic set OHSU Total retrieved: 63000 Total relevant: 3205 Total rels retrieved: 3016

Interpolated Recall-Precision Averages Recall Precision 0.00 0.8489 0.10 0.6724 0.20 0.5605 0.30 0.4931 0.40 0.4277 0.50 0.3713 0.60 0.3201 0.70 0.2779 0.80 0.2406 0.90 0.1737 1.00 0.0567 Non-interpolated average precision 0.3851 Document Level Averages Precision At 5 docs 0.6159 At 10 docs 0.5651 At 15 docs 0.5164 At 20 docs 0.4770 At 30 docs 0.4291 At 50 docs 0.3702 At 100 docs 0.2746 At 200 docs 0.1813 At 500 docs 0.0909 At 1000 docs 0.0479 R-precision 0.3947

Filtering track results — Informatique-CDC, DTA Routing runs

Run S2RNsamp Sub task routing Query construction automatic .M field used? no TREC data used in training? yes non-TREC data used ? no Optimized for Average Precision Topic set MESH-SAMPLE Total retrieved: 500000 Total relevant: 124553 Total rels retrieved: 67484

Interpolated Recall-Precision Averages Recall Precision 0.00 0.8525 0.10 0.6257 0.20 0.5481 0.30 0.4892 0.40 0.4268 0.50 0.3624 0.60 0.2867 0.70 0.1931 0.80 0.1052 0.90 0.0242 1.00 0.0005 Non-interpolated average precision 0.3348 Document Level Averages Precision At 5 docs 0.6612 At 10 docs 0.6328 At 15 docs 0.6173 At 20 docs 0.6035 At 30 docs 0.5793 At 50 docs 0.5369 At 100 docs 0.4479 At 200 docs 0.3393 At 500 docs 0.2123 At 1000 docs 0.1350 R-precision 0.4097