Cross-language track results — CEA (Commissariat ‘ l’Energie Atomique)

Summary Statistics Run Number ceat7e1n Run Description English topics, EF documents automatic, desc Number of Topics 28 Total number of documents over all topics Retrieved: 25108 Relevant: 2680 Rel-ret: 1331

Recall Level Precision Averages Recall Precision 0.00 0.5705 0.10 0.2830 0.20 0.2150 0.30 0.1842 0.40 0.1396 0.50 0.1114 0.60 0.0804 0.70 0.0699 0.80 0.0445 0.90 0.0420 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1271

Document Level Averages Precision At 5 docs 0.2857 At 10 docs 0.2679 At 15 docs 0.2619 At 20 docs 0.2393 At 30 docs 0.2190 At 100 docs 0.1589 At 200 docs 0.1154 At 500 docs 0.0747 At 1000 docs 0.0475 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.1810

0.0 0.2 0.4 0.6 0.8 1.0

Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

Recall-Precision Curve

25 30 35 40 45 50

Topic

-1.0

-0.5

0.0

0.5

Difference

Difference from Median in Average Precision per Topic