Ad hoc results — IIT/AAT/NCR

Summary Statistics Run Number iit98au2 Run Description Automatic, title Number of Topics 50 Total number of documents over all topics Retrieved: 26763 Relevant: 4674 Rel-ret: 1676

Recall Level Precision Averages Recall Precision 0.00 0.5988 0.10 0.3404 0.20 0.2302 0.30 0.1973 0.40 0.1452 0.50 0.1097 0.60 0.0795 0.70 0.0550 0.80 0.0428 0.90 0.0349 1.00 0.0065 Average precision over all relevant docs non-interpolated 0.1459

Document Level Averages Precision At 5 docs 0.3080 At 10 docs 0.3200 At 15 docs 0.2960 At 20 docs 0.2770 At 30 docs 0.2493 At 100 docs 0.1500 At 200 docs 0.1071 At 500 docs 0.0579 At 1000 docs 0.0335 R-Precision (precision after R docs retrieved (where R is the number of relevant documents)) Exact 0.2000

0.0 0.2 0.4 0.6 0.8 1.0

Recall 0.0

0.2

0.4

0.6

0.8

1.0

Precision

Recall-Precision Curve

350 360 370 380 390 400

Topic

-1.0

-0.5

0.0

0.5

Difference

Difference from Median in Average Precision per Topic