spanish results - Dublin City University

Summary Statistics Run Number DCU965–manual Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2157

Recall Level Precision Averages Recall Precision 0.00 0.7661 0.10 0.6335 0.20 0.5383 0.30 0.4719 0.40 0.3985 0.50 0.3404 0.60 0.2819 0.70 0.2213 0.80 0.1697 0.90 0.1020 1.00 0.0021 Average precision over all relevant docs non-interpolated 0.3482

Document Level Averages Precision At 5 docs 0.5840 At 10 docs 0.5760 At 15 docs 0.5360 At 20 docs 0.5100 At 30 docs 0.4813 At 100 docs 0.3676 At 200 docs 0.2734 At 500 docs 0.1488 At 1000 docs 0.0863

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3729

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Dublin City University

Summary Statistics Run Number DCU966–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2109

Recall Level Precision Averages Recall Precision 0.00 0.6905 0.10 0.6268 0.20 0.4985 0.30 0.4227 0.40 0.3700 0.50 0.3299 0.60 0.2773 0.70 0.2217 0.80 0.1744 0.90 0.1192 1.00 0.0026 Average precision over all relevant docs non-interpolated 0.3298

Document Level Averages Precision At 5 docs 0.4800 At 10 docs 0.4960 At 15 docs 0.5013 At 20 docs 0.4840 At 30 docs 0.4507 At 100 docs 0.3352 At 200 docs 0.2524 At 500 docs 0.1446 At 1000 docs 0.0844

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3553

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Dublin City University

Summary Statistics Run Number DCU967–manual Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2037

Recall Level Precision Averages Recall Precision 0.00 0.8565 0.10 0.6428 0.20 0.5547 0.30 0.4733 0.40 0.4213 0.50 0.3533 0.60 0.2660 0.70 0.1954 0.80 0.1468 0.90 0.0927 1.00 0.0004 Average precision over all relevant docs non-interpolated 0.3482

Document Level Averages Precision At 5 docs 0.6080 At 10 docs 0.5760 At 15 docs 0.5067 At 20 docs 0.4820 At 30 docs 0.4427 At 100 docs 0.3612 At 200 docs 0.2626 At 500 docs 0.1431 At 1000 docs 0.0815

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3733

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - New Mexico State University

Summary Statistics Run Number nmsuc1–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1892

Recall Level Precision Averages Recall Precision 0.00 0.7812 0.10 0.5712 0.20 0.4729 0.30 0.3962 0.40 0.3315 0.50 0.2890 0.60 0.2402 0.70 0.1653 0.80 0.0981 0.90 0.0408 1.00 0.0026 Average precision over all relevant docs non-interpolated 0.2895

Document Level Averages Precision At 5 docs 0.5520 At 10 docs 0.4880 At 15 docs 0.4533 At 20 docs 0.4240 At 30 docs 0.3947 At 100 docs 0.3024 At 200 docs 0.2284 At 500 docs 0.1279 At 1000 docs 0.0757

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3397

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - New Mexico State University

Summary Statistics Run Number nmsuc2–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1305

Recall Level Precision Averages Recall Precision 0.00 0.5058 0.10 0.3078 0.20 0.2346 0.30 0.2063 0.40 0.1768 0.50 0.1458 0.60 0.0882 0.70 0.0511 0.80 0.0251 0.90 0.0132 1.00 0.0032 Average precision over all relevant docs non-interpolated 0.1422

Document Level Averages Precision At 5 docs 0.2800 At 10 docs 0.2560 At 15 docs 0.2400 At 20 docs 0.2240 At 30 docs 0.2187 At 100 docs 0.1880 At 200 docs 0.1414 At 500 docs 0.0836 At 1000 docs 0.0522

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1834

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - New Mexico State University

Summary Statistics Run Number nmsuc3–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1210

Recall Level Precision Averages Recall Precision 0.00 0.4804 0.10 0.2429 0.20 0.1687 0.30 0.1439 0.40 0.1216 0.50 0.1098 0.60 0.0873 0.70 0.0629 0.80 0.0363 0.90 0.0099 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1153

Document Level Averages Precision At 5 docs 0.2800 At 10 docs 0.2320 At 15 docs 0.2240 At 20 docs 0.2100 At 30 docs 0.1840 At 100 docs 0.1496 At 200 docs 0.1176 At 500 docs 0.0737 At 1000 docs 0.0484

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1420

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - George Mason University

Summary Statistics Run Number gmu96sp1–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1689

Recall Level Precision Averages Recall Precision 0.00 0.5441 0.10 0.4237 0.20 0.3798 0.30 0.3218 0.40 0.2965 0.50 0.2601 0.60 0.1884 0.70 0.1482 0.80 0.1222 0.90 0.0786 1.00 0.0102 Average precision over all relevant docs non-interpolated 0.2403

Document Level Averages Precision At 5 docs 0.3760 At 10 docs 0.3520 At 15 docs 0.3173 At 20 docs 0.3020 At 30 docs 0.2773 At 100 docs 0.2160 At 200 docs 0.1716 At 500 docs 0.1089 At 1000 docs 0.0676

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2482

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Xerox

Summary Statistics Run Number xerox-spS–automatic, long topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1497

Recall Level Precision Averages Recall Precision 0.00 0.8264 0.10 0.6407 0.20 0.5159 0.30 0.4409 0.40 0.3503 0.50 0.2886 0.60 0.1685 0.70 0.1270 0.80 0.0640 0.90 0.0281 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.2946

Document Level Averages Precision At 5 docs 0.5920 At 10 docs 0.5320 At 15 docs 0.4800 At 20 docs 0.4600 At 30 docs 0.4293 At 100 docs 0.3212 At 200 docs 0.2272 At 500 docs 0.1111 At 1000 docs 0.0599

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3376

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Xerox

Summary Statistics Run Number xerox-spP–automatic, long topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1496

Recall Level Precision Averages Recall Precision 0.00 0.8139 0.10 0.6144 0.20 0.5209 0.30 0.4538 0.40 0.3748 0.50 0.3101 0.60 0.1944 0.70 0.1354 0.80 0.0751 0.90 0.0282 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.3005

Document Level Averages Precision At 5 docs 0.5600 At 10 docs 0.5280 At 15 docs 0.4960 At 20 docs 0.4600 At 30 docs 0.4213 At 100 docs 0.3244 At 200 docs 0.2268 At 500 docs 0.1095 At 1000 docs 0.0598

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3500

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Xerox

Summary Statistics Run Number xerox-spT–automatic, long topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1115

Recall Level Precision Averages Recall Precision 0.00 0.4454 0.10 0.2553 0.20 0.2185 0.30 0.1863 0.40 0.1230 0.50 0.0972 0.60 0.0503 0.70 0.0276 0.80 0.0238 0.90 0.0157 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.1154

Document Level Averages Precision At 5 docs 0.2800 At 10 docs 0.2480 At 15 docs 0.2427 At 20 docs 0.2340 At 30 docs 0.2213 At 100 docs 0.1744 At 200 docs 0.1314 At 500 docs 0.0766 At 1000 docs 0.0446

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1547

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - University of Massachusetts

Summary Statistics Run Number SIN300–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2320

Recall Level Precision Averages Recall Precision 0.00 0.8885 0.10 0.7545 0.20 0.6182 0.30 0.5873 0.40 0.5466 0.50 0.4711 0.60 0.4015 0.70 0.3234 0.80 0.2748 0.90 0.1909 1.00 0.0141 Average precision over all relevant docs non-interpolated 0.4551

Document Level Averages Precision At 5 docs 0.6720 At 10 docs 0.6200 At 15 docs 0.5787 At 20 docs 0.5400 At 30 docs 0.5253 At 100 docs 0.4044 At 200 docs 0.3066 At 500 docs 0.1683 At 1000 docs 0.0928

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.4474

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - University of Massachusetts

Summary Statistics Run Number SIN301–automatic, long topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2377

Recall Level Precision Averages Recall Precision 0.00 0.8864 0.10 0.7962 0.20 0.6899 0.30 0.6343 0.40 0.5969 0.50 0.5482 0.60 0.4755 0.70 0.4030 0.80 0.3241 0.90 0.2287 1.00 0.0312 Average precision over all relevant docs non-interpolated 0.5058

Document Level Averages Precision At 5 docs 0.6800 At 10 docs 0.6680 At 15 docs 0.6347 At 20 docs 0.6080 At 30 docs 0.5893 At 100 docs 0.4532 At 200 docs 0.3382 At 500 docs 0.1769 At 1000 docs 0.0951

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.5106

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Cornell University

Summary Statistics Run Number Cor5SP1s–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2103

Recall Level Precision Averages Recall Precision 0.00 0.7798 0.10 0.6367 0.20 0.5556 0.30 0.4952 0.40 0.4488 0.50 0.4128 0.60 0.3560 0.70 0.2952 0.80 0.2500 0.90 0.1666 1.00 0.0198 Average precision over all relevant docs non-interpolated 0.3949

Document Level Averages Precision At 5 docs 0.6160 At 10 docs 0.5480 At 15 docs 0.4987 At 20 docs 0.4740 At 30 docs 0.4333 At 100 docs 0.3448 At 200 docs 0.2624 At 500 docs 0.1469 At 1000 docs 0.0841

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3890

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Cornell University

Summary Statistics Run Number Cor5SP2l–automatic, long topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2222

Recall Level Precision Averages Recall Precision 0.00 0.7482 0.10 0.6729 0.20 0.5840 0.30 0.5505 0.40 0.5172 0.50 0.4739 0.60 0.4081 0.70 0.3338 0.80 0.2842 0.90 0.1820 1.00 0.0393 Average precision over all relevant docs non-interpolated 0.4323

Document Level Averages Precision At 5 docs 0.6080 At 10 docs 0.5640 At 15 docs 0.5307 At 20 docs 0.5020 At 30 docs 0.4787 At 100 docs 0.3796 At 200 docs 0.2988 At 500 docs 0.1606 At 1000 docs 0.0889

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.4468

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - University of California, Berkeley

Summary Statistics Run Number BrklySP5–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1632

Recall Level Precision Averages Recall Precision 0.00 0.6583 0.10 0.4935 0.20 0.3701 0.30 0.3298 0.40 0.2902 0.50 0.2594 0.60 0.2248 0.70 0.1502 0.80 0.1166 0.90 0.0469 1.00 0.0005 Average precision over all relevant docs non-interpolated 0.2526

Document Level Averages Precision At 5 docs 0.4640 At 10 docs 0.4200 At 15 docs 0.3920 At 20 docs 0.3600 At 30 docs 0.3373 At 100 docs 0.2424 At 200 docs 0.1754 At 500 docs 0.1043 At 1000 docs 0.0653

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2766

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - University of California, Berkeley

Summary Statistics Run Number BrklySP6–manual Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 2103

Recall Level Precision Averages Recall Precision 0.00 0.7726 0.10 0.6171 0.20 0.5017 0.30 0.4387 0.40 0.3946 0.50 0.3596 0.60 0.3151 0.70 0.2363 0.80 0.2002 0.90 0.1561 1.00 0.0160 Average precision over all relevant docs non-interpolated 0.3488

Document Level Averages Precision At 5 docs 0.5120 At 10 docs 0.5040 At 15 docs 0.4693 At 20 docs 0.4560 At 30 docs 0.4320 At 100 docs 0.3040 At 200 docs 0.2242 At 500 docs 0.1346 At 1000 docs 0.0841

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3822

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - Xerox

Summary Statistics Run Number xerox-spD–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1475

Recall Level Precision Averages Recall Precision 0.00 0.7409 0.10 0.5744 0.20 0.4581 0.30 0.3811 0.40 0.3212 0.50 0.2703 0.60 0.2019 0.70 0.1453 0.80 0.0992 0.90 0.0259 1.00 0.0000 Average precision over all relevant docs non-interpolated 0.2745

Document Level Averages Precision At 5 docs 0.5280 At 10 docs 0.4480 At 15 docs 0.4267 At 20 docs 0.4120 At 30 docs 0.3747 At 100 docs 0.2760 At 200 docs 0.2010 At 500 docs 0.1054 At 1000 docs 0.0590

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3258

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve 3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision spanish results - George Mason University

Summary Statistics Run Number gmu96sp2–automatic, short topic Number of Topics 25 Total number of documents over all topics Retrieved: 25000 Relevant: 2505 Rel ret: 1606

Recall Level Precision Averages Recall Precision 0.00 0.4538 0.10 0.3600 0.20 0.3246 0.30 0.2809 0.40 0.2504 0.50 0.2087 0.60 0.1458 0.70 0.1076 0.80 0.0865 0.90 0.0336 1.00 0.0003 Average precision over all relevant docs non-interpolated 0.1900

Document Level Averages Precision At 5 docs 0.2240 At 10 docs 0.2320 At 15 docs 0.2293 At 20 docs 0.2420 At 30 docs 0.2400 At 100 docs 0.1924 At 200 docs 0.1570 At 500 docs 0.1006 At 1000 docs 0.0642

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2149

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

51 60 70 75

Median

Topics

Average Precision