nlp results - Xerox

Summary Statistics Run Number xerox-nlp1{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 664

Recall Level Precision Averages Recall Precision 0.00 0.4673 0.10 0.4312 0.20 0.3425 0.30 0.2632 0.40 0.2155 0.50 0.1835 0.60 0.1368 0.70 0.1108 0.80 0.0908 0.90 0.0696 1.00 0.0582 Average precision over all relevant docs non-interpolated 0.2002

Document Level Averages Precision At 5 docs 0.2711 At 10 docs 0.2200 At 15 docs 0.1911 At 20 docs 0.1522 At 30 docs 0.1252 At 100 docs 0.0676 At 200 docs 0.0456 At 500 docs 0.0248 At 1000 docs 0.0148

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2060

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - Xerox

Summary Statistics Run Number xerox-nlp2{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 672

Recall Level Precision Averages Recall Precision 0.00 0.4789 0.10 0.4353 0.20 0.3635 0.30 0.2872 0.40 0.2318 0.50 0.2064 0.60 0.1585 0.70 0.1243 0.80 0.1006 0.90 0.0802 1.00 0.0706 Average precision over all relevant docs non-interpolated 0.2147

Document Level Averages Precision At 5 docs 0.2711 At 10 docs 0.2200 At 15 docs 0.1807 At 20 docs 0.1522 At 30 docs 0.1244 At 100 docs 0.0662 At 200 docs 0.0452 At 500 docs 0.0251 At 1000 docs 0.0149

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2172

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - Xerox

Summary Statistics Run Number xerox-nlp3{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 613

Recall Level Precision Averages Recall Precision 0.00 0.3292 0.10 0.2780 0.20 0.2355 0.30 0.1943 0.40 0.1526 0.50 0.1394 0.60 0.1089 0.70 0.0840 0.80 0.0591 0.90 0.0469 1.00 0.0396 Average precision over all relevant docs non-interpolated 0.1397

Document Level Averages Precision At 5 docs 0.1911 At 10 docs 0.1711 At 15 docs 0.1348 At 20 docs 0.1144 At 30 docs 0.0963 At 100 docs 0.0556 At 200 docs 0.0371 At 500 docs 0.0220 At 1000 docs 0.0136

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1535

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - Xerox

Summary Statistics Run Number xerox-nlp4{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 680

Recall Level Precision Averages Recall Precision 0.00 0.4925 0.10 0.4371 0.20 0.3839 0.30 0.2990 0.40 0.2392 0.50 0.2207 0.60 0.1765 0.70 0.1389 0.80 0.1134 0.90 0.0926 1.00 0.0830 Average precision over all relevant docs non-interpolated 0.2276

Document Level Averages Precision At 5 docs 0.2800 At 10 docs 0.2178 At 15 docs 0.1867 At 20 docs 0.1633 At 30 docs 0.1274 At 100 docs 0.0671 At 200 docs 0.0458 At 500 docs 0.0253 At 1000 docs 0.0151

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2460

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - Xerox

Summary Statistics Run Number xerox-nlp5{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 679

Recall Level Precision Averages Recall Precision 0.00 0.4982 0.10 0.4446 0.20 0.3841 0.30 0.2957 0.40 0.2500 0.50 0.2327 0.60 0.1829 0.70 0.1407 0.80 0.1152 0.90 0.0938 1.00 0.0834 Average precision over all relevant docs non-interpolated 0.2320

Document Level Averages Precision At 5 docs 0.2667 At 10 docs 0.2156 At 15 docs 0.1896 At 20 docs 0.1611 At 30 docs 0.1296 At 100 docs 0.0678 At 200 docs 0.0463 At 500 docs 0.0253 At 1000 docs 0.0151

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2488

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - Xerox

Summary Statistics Run Number xerox-nlp6{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 679

Recall Level Precision Averages Recall Precision 0.00 0.4971 0.10 0.4472 0.20 0.3848 0.30 0.2926 0.40 0.2445 0.50 0.2258 0.60 0.1777 0.70 0.1403 0.80 0.1149 0.90 0.0936 1.00 0.0834 Average precision over all relevant docs non-interpolated 0.2295

Document Level Averages Precision At 5 docs 0.2756 At 10 docs 0.2178 At 15 docs 0.1852 At 20 docs 0.1633 At 30 docs 0.1296 At 100 docs 0.0676 At 200 docs 0.0463 At 500 docs 0.0252 At 1000 docs 0.0151

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2473

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number genlp1{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 656

Recall Level Precision Averages Recall Precision 0.00 0.4418 0.10 0.3369 0.20 0.2920 0.30 0.2366 0.40 0.1999 0.50 0.1840 0.60 0.1321 0.70 0.1072 0.80 0.0825 0.90 0.0607 1.00 0.0511 Average precision over all relevant docs non-interpolated 0.1773

Document Level Averages Precision At 5 docs 0.2311 At 10 docs 0.2044 At 15 docs 0.1630 At 20 docs 0.1456 At 30 docs 0.1230 At 100 docs 0.0664 At 200 docs 0.0438 At 500 docs 0.0246 At 1000 docs 0.0146

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1776

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number genlp2{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 444

Recall Level Precision Averages Recall Precision 0.00 0.1415 0.10 0.1133 0.20 0.0818 0.30 0.0695 0.40 0.0474 0.50 0.0397 0.60 0.0251 0.70 0.0145 0.80 0.0106 0.90 0.0083 1.00 0.0062 Average precision over all relevant docs non-interpolated 0.0440

Document Level Averages Precision At 5 docs 0.0533 At 10 docs 0.0578 At 15 docs 0.0519 At 20 docs 0.0467 At 30 docs 0.0430 At 100 docs 0.0309 At 200 docs 0.0239 At 500 docs 0.0141 At 1000 docs 0.0099

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.0583

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number genlp3{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 456

Recall Level Precision Averages Recall Precision 0.00 0.1845 0.10 0.1507 0.20 0.1205 0.30 0.0897 0.40 0.0810 0.50 0.0641 0.60 0.0470 0.70 0.0303 0.80 0.0168 0.90 0.0136 1.00 0.0133 Average precision over all relevant docs non-interpolated 0.0654

Document Level Averages Precision At 5 docs 0.0800 At 10 docs 0.0844 At 15 docs 0.0696 At 20 docs 0.0644 At 30 docs 0.0570 At 100 docs 0.0358 At 200 docs 0.0249 At 500 docs 0.0143 At 1000 docs 0.0101

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.0818

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number genlp4{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 814

Recall Level Precision Averages Recall Precision 0.00 0.7327 0.10 0.6462 0.20 0.4946 0.30 0.3987 0.40 0.3250 0.50 0.2974 0.60 0.2455 0.70 0.2144 0.80 0.1641 0.90 0.1327 1.00 0.1118 Average precision over all relevant docs non-interpolated 0.3176

Document Level Averages Precision At 5 docs 0.3867 At 10 docs 0.3156 At 15 docs 0.2741 At 20 docs 0.2433 At 30 docs 0.2030 At 100 docs 0.0998 At 200 docs 0.0639 At 500 docs 0.0315 At 1000 docs 0.0181

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.3091

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number sbase1.new{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 623

Recall Level Precision Averages Recall Precision 0.00 0.3437 0.10 0.3098 0.20 0.2558 0.30 0.1964 0.40 0.1593 0.50 0.1498 0.60 0.1016 0.70 0.0882 0.80 0.0617 0.90 0.0543 1.00 0.0469 Average precision over all relevant docs non-interpolated 0.1478

Document Level Averages Precision At 5 docs 0.1911 At 10 docs 0.1578 At 15 docs 0.1333 At 20 docs 0.1256 At 30 docs 0.1030 At 100 docs 0.0544 At 200 docs 0.0374 At 500 docs 0.0220 At 1000 docs 0.0138

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1609

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - GE

Summary Statistics Run Number sbase2.new{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 689

Recall Level Precision Averages Recall Precision 0.00 0.4578 0.10 0.3808 0.20 0.3413 0.30 0.2658 0.40 0.2248 0.50 0.1992 0.60 0.1707 0.70 0.1364 0.80 0.1082 0.90 0.0892 1.00 0.0796 Average precision over all relevant docs non-interpolated 0.2078

Document Level Averages Precision At 5 docs 0.2622 At 10 docs 0.2044 At 15 docs 0.1733 At 20 docs 0.1578 At 30 docs 0.1341 At 100 docs 0.0696 At 200 docs 0.0453 At 500 docs 0.0253 At 1000 docs 0.0153

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2126

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - MITRE

Summary Statistics Run Number MTRa961{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 650

Recall Level Precision Averages Recall Precision 0.00 0.4127 0.10 0.3647 0.20 0.2972 0.30 0.2425 0.40 0.1968 0.50 0.1805 0.60 0.1492 0.70 0.1289 0.80 0.1138 0.90 0.0901 1.00 0.0811 Average precision over all relevant docs non-interpolated 0.1896

Document Level Averages Precision At 5 docs 0.2400 At 10 docs 0.1844 At 15 docs 0.1585 At 20 docs 0.1456 At 30 docs 0.1222 At 100 docs 0.0707 At 200 docs 0.0473 At 500 docs 0.0244 At 1000 docs 0.0144

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1859

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - CLARITECH Corporation

Summary Statistics Run Number CLATMC{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 766

Recall Level Precision Averages Recall Precision 0.00 0.5752 0.10 0.4978 0.20 0.4332 0.30 0.3447 0.40 0.3111 0.50 0.2950 0.60 0.2421 0.70 0.2001 0.80 0.1676 0.90 0.1343 1.00 0.1144 Average precision over all relevant docs non-interpolated 0.2842

Document Level Averages Precision At 5 docs 0.3333 At 10 docs 0.2778 At 15 docs 0.2370 At 20 docs 0.2122 At 30 docs 0.1793 At 100 docs 0.0984 At 200 docs 0.0618 At 500 docs 0.0304 At 1000 docs 0.0170

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2934

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - CLARITECH Corporation

Summary Statistics Run Number CLATMN{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 786

Recall Level Precision Averages Recall Precision 0.00 0.4767 0.10 0.4171 0.20 0.3939 0.30 0.3197 0.40 0.2732 0.50 0.2509 0.60 0.1917 0.70 0.1500 0.80 0.1150 0.90 0.0758 1.00 0.0614 Average precision over all relevant docs non-interpolated 0.2346

Document Level Averages Precision At 5 docs 0.3022 At 10 docs 0.2533 At 15 docs 0.2252 At 20 docs 0.2044 At 30 docs 0.1778 At 100 docs 0.0976 At 200 docs 0.0603 At 500 docs 0.0308 At 1000 docs 0.0175

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2345

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - CLARITECH Corporation

Summary Statistics Run Number CLPHR0{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 567

Recall Level Precision Averages Recall Precision 0.00 0.4235 0.10 0.3686 0.20 0.3236 0.30 0.2528 0.40 0.1940 0.50 0.1766 0.60 0.1444 0.70 0.1144 0.80 0.0748 0.90 0.0534 1.00 0.0413 Average precision over all relevant docs non-interpolated 0.1834

Document Level Averages Precision At 5 docs 0.2578 At 10 docs 0.2156 At 15 docs 0.1733 At 20 docs 0.1567 At 30 docs 0.1281 At 100 docs 0.0667 At 200 docs 0.0431 At 500 docs 0.0224 At 1000 docs 0.0126

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.1821

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - CLARITECH Corporation

Summary Statistics Run Number CLPHR1{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 609

Recall Level Precision Averages Recall Precision 0.00 0.4465 0.10 0.4135 0.20 0.3320 0.30 0.2651 0.40 0.2223 0.50 0.2028 0.60 0.1540 0.70 0.1257 0.80 0.1004 0.90 0.0756 1.00 0.0688 Average precision over all relevant docs non-interpolated 0.2010

Document Level Averages Precision At 5 docs 0.2444 At 10 docs 0.2022 At 15 docs 0.1837 At 20 docs 0.1744 At 30 docs 0.1430 At 100 docs 0.0713 At 200 docs 0.0451 At 500 docs 0.0231 At 1000 docs 0.0135

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2127

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision nlp results - CLARITECH Corporation

Summary Statistics Run Number CLPHR2{ Number of Topics 45 Total number of documents over all topics Retrieved: 45000 Relevant: 1064 Rel ret: 622

Recall Level Precision Averages Recall Precision 0.00 0.4316 0.10 0.3973 0.20 0.3267 0.30 0.2684 0.40 0.2255 0.50 0.2078 0.60 0.1502 0.70 0.1330 0.80 0.1021 0.90 0.0760 1.00 0.0683 Average precision over all relevant docs non-interpolated 0.1997

Document Level Averages Precision At 5 docs 0.2578 At 10 docs 0.2133 At 15 docs 0.1763 At 20 docs 0.1644 At 30 docs 0.1422 At 100 docs 0.0722 At 200 docs 0.0451 At 500 docs 0.0234 At 1000 docs 0.0138

R�Precision (precision after R

docs retrieved (where R is the number of relevant documents)) Exact 0.2044

0 0.2 0.4 0.6 0.8 1

0 0.2 0.4 0.6 0.8 1

Precision

Recall

Recall-Precision Curve

3 3 3 3 3 3 3 3 3 3 3

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

251 260 271 284 294 300

Median

Topics

Average Precision