confusion results — ETHFR94N

Table 1: Raw Ranks ETHFR94 ETHD5N ETHD20N 1 1 1 2 2 8 15 44 3 2 2 1 4 5 11 24 5 1 1 1 6 1 1 1 7 2 2 2 8 1 1 1 9 2 6 2 10 1 1 8 11 1 1 2 12 1 125 92 13 3 3 3 14 2 1 97 15 1 462 2000 16 1 1 1 17 1 7 11 18 1 2 10 19 1 1 93 20 1 1 9 21 2 2 9 22 1 1 3 23 1 1 2 24 6 7 4 25 1 1 1 26 1 1 2 27 1 1 18 28 6 13 384 30 16 39 60 31 2 2 3 32 7 10 29 33 1 1 1 34 1 3 23 35 1 1 1 36 1 94 981 37 1 1 37 38 1 9 23 39 1 15 342 40 26 138 435 41 1 1 5 42 1 1 5 43 1 13 14 44 1 1 1 45 1 1 1 46 11 103 2000 47 266 119 186 48 2 3 425 49 1 1 6 50 5 2 156 Mean rank when found

8.24 25.10 75.77

Mean reciprocal rank

0.7353 0.5737 0.3218

Table 2: Histogram Number of items found at rank r where ETHFR94 ETHD5N ETHD20N

1 ˇ r ˇ 10 45 37 27 10 ¡ r ˇ 100 3 7 13 100 ¡ r ˇ 1000 1 5 7

Not found 0 0 2