filtering results - HNC

Table 1: Raw Data

Run 1 Run 2 Run 3 topic set pool sample set pool sample set pool sample size util. util. size util. util. size util. util.

3 0 0.0 0.0 +/- 0.0 25 3.0 3.0 +/- 0.0 55 45.0 45.0 +/- 0.0 5 17 -11.0 -11.0 +/- 0.0 17 3.0 3.0 +/- 0.0 158 74.0 45.1 +/- 35.5 14 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 9 11.0 11.0 +/- 0.0 17 66 46.0 50.0 +/- 15.4 133 97.0 104.7 +/- 28.3 274 422.0 483.4 +/- 88.5 20 36 -24.0 -24.0 +/- 0.0 62 6.0 6.0 +/- 0.0 124 144.0 122.9 +/- 24.7 27 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 40 40.0 40.0 +/- 0.0 28 1 -3.0 -3.0 +/- 0.0 1 -1.0 -1.0 +/- 0.0 82 122.0 122.0 +/- 0.0 29 0 0.0 0.0 +/- 0.0 1 1.0 1.0 +/- 0.0 1 3.0 3.0 +/- 0.0 30 1 1.0 1.0 +/- 0.0 15 -5.0 -5.0 +/- 0.0 255 -31.0 -88.2 +/- 59.4 31 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 32 1 -3.0 -3.0 +/- 0.0 2 0.0 0.0 +/- 0.0 7 5.0 5.0 +/- 0.0 35 13 -15.0 -15.0 +/- 0.0 362 -202.0 -207.2 +/- 157.3 624 -240.0 -192.6 +/- 182.7 36 22 -10.0 -10.0 +/- 0.0 24 6.0 6.0 +/- 0.0 213 -29.0 -23.7 +/- 49.8 40 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 12 -12.0 -12.0 +/- 0.0 41 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 43 1 -3.0 -3.0 +/- 0.0 1 -1.0 -1.0 +/- 0.0 48 20.0 20.0 +/- 0.0 44 1 1.0 1.0 +/- 0.0 6 0.0 0.0 +/- 0.0 15 13.0 13.0 +/- 0.0 45 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 35 -27.0 -27.0 +/- 0.0 46 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 47 0 0.0 0.0 +/- 0.0 7 1.0 1.0 +/- 0.0 62 38.0 38.0 +/- 0.0 48 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 49 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 1 3.0 3.0 +/- 0.0 50 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 63 3 3.0 3.0 +/- 0.0 18 2.0 2.0 +/- 0.0 43 45.0 45.0 +/- 0.0 66 13 -23.0 -23.0 +/- 0.0 42 -14.0 -14.0 +/- 0.0 71 5.0 5.0 +/- 0.0 76 0 0.0 0.0 +/- 0.0 2 0.0 0.0 +/- 0.0 10 2.0 2.0 +/- 0.0 82 5 1.0 1.0 +/- 0.0 51 -9.0 -9.0 +/- 0.0 102 26.0 23.6 +/- 4.6 84 0 0.0 0.0 +/- 0.0 4 -4.0 -4.0 +/- 0.0 47 -7.0 -7.0 +/- 0.0 94 4 4.0 4.0 +/- 0.0 16 10.0 10.0 +/- 0.0 26 50.0 50.0 +/- 0.0 95 0 0.0 0.0 +/- 0.0 4 4.0 4.0 +/- 0.0 6 14.0 14.0 +/- 0.0 96 27 -9.0 -9.0 +/- 0.0 116 -16.0 -16.1 +/- 40.7 251 13.0 4.2 +/- 59.9 100 14 14.0 14.0 +/- 0.0 17 17.0 17.0 +/- 0.0 40 104.0 104.0 +/- 0.0 103 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 1 -1.0 -1.0 +/- 0.0 106 1 1.0 1.0 +/- 0.0 1 1.0 1.0 +/- 0.0 11 -3.0 -3.0 +/- 0.0 113 2 2.0 2.0 +/- 0.0 2 2.0 2.0 +/- 0.0 81 -5.0 -5.0 +/- 0.0 115 0 0.0 0.0 +/- 0.0 1 -1.0 -1.0 +/- 0.0 2 2.0 2.0 +/- 0.0 117 0 0.0 0.0 +/- 0.0 77 7.0 3.1 +/- 25.5 210 162.0 216.2 +/- 64.1 119 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 123 12 -12.0 -12.0 +/- 0.0 28 -6.0 -6.0 +/- 0.0 286 -90.0 -55.7 +/- 78.4 125 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 142 3 -9.0 -9.0 +/- 0.0 5 -1.0 -5.0 +/- 0.0 47 33.0 -47.0 +/- 0.0 143 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 2 2.0 2.0 +/- 0.0 161 0 0.0 0.0 +/- 0.0 1 -1.0 -1.0 +/- 0.0 4 4.0 4.0 +/- 0.0 169 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 2 -2.0 -2.0 +/- 0.0 171 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 0 0.0 0.0 +/- 0.0 173 0 0.0 0.0 +/- 0.0 5 -3.0 -3.0 +/- 0.0 41 -21.0 -21.0 +/- 0.0 174 0 0.0 0.0 +/- 0.0 14 12.0 12.0 +/- 0.0 72 192.0 192.0 +/- 0.0 182 2 -6.0 -6.0 +/- 0.0 5 -5.0 -5.0 +/- 0.0 502 -82.0 -167.2 +/- 135.3 188 1 -3.0 -3.0 +/- 0.0 2 -2.0 -2.0 +/- 0.0 9 -1.0 -1.0 +/- 0.0 191 4 -4.0 -4.0 +/- 0.0 12 0.0 0.0 +/- 0.0 49 23.0 23.0 +/- 0.0