filtering results - ACQ

Summary Statistics Run Number ACQ–category A, manual Number of Topics 50 Total number of documents over all topics Run 1 Run 2 Run 3 Retrieved: 1386 4107 9262 Relevant: 6576 6576 6576 Rel ret: 230 571 856

Average Effectiveness

(Pooled Sample) Recall Precision Fallout Run 1 0.032 0.205 0.0001 Run 2 0.078 0.135 0.0003 Run 3 0.138 0.091 0.0008

Number of topics where this site’s Utility was Mean 1st 2nd 3rd 4th Rank Pooled Run 1 3 1 5 41 3.755 Run 2 0 1 9 40 3.857 Run 3 0 1 5 44 3.939 Sampled Run 1 3 1 5 41 3.755 Run 2 0 1 10 39 3.837 Run 3 0 1 9 40 3.857 filtering results - ACQ