Blog Track results, polarity task — Indiana University

Summary Statistics Run ID: top3dt1mP5.positive Corresponding baseline: NA Topic fields used title Document fields used permalinks Number of Topics: 149 Total number of documents over all topics Retrieved: 149000 Relevant and contains an opinion: 10457 Relevant opinion documents retrieved: 8227

Recall Level Averages Recall Precision 0.00 0.4733 0.10 0.3162 0.20 0.2694 0.30 0.2425 0.40 0.2139 0.50 0.1972 0.60 0.1692 0.70 0.1389 0.80 0.1037 0.90 0.0658 1.00 0.0332 Mean average precision non-interpolated 0.1836

Document Level Averages Precision At 5 docs 0.2416 At 10 docs 0.2336 At 15 docs 0.2286 At 20 docs 0.2329 At 30 docs 0.2235 At 100 docs 0.1662 At 200 docs 0.1373 At 500 docs 0.0900 At 1000 docs 0.0552 R-Precision: precision after R (number relevant) documents retrieved Exact 0.2048