Blog Track results, opinion search task — University of Neuchatel

Summary Statistics Run ID: UniNEopZ1 Corresponding baseline: UniNEBlog1 Topic fields used title, description Document fields used permalinks Number of Topics: 150 Total number of documents over all topics Retrieved: 101603 Relevant and contains an opinion: 27327 Relevant opinion documents retrieved: 17572

Recall Level Averages

Recall Precision 0.00 0.8140 0.10 0.5983 0.20 0.5279 0.30 0.4513 0.40 0.3943 0.50 0.3298 0.60 0.2473 0.70 0.1712 0.80 0.0975 0.90 0.0375 1.00 0.0086 Mean average precision non-interpolated 0.3095

Document Level Averages Precision At 5 docs 0.5680 At 10 docs 0.5587 At 15 docs 0.5316 At 20 docs 0.5203 At 30 docs 0.4887 At 100 docs 0.3811 At 200 docs 0.3106 At 500 docs 0.2039 At 1000 docs 0.1171 R-Precision: precision after R (number relevant) documents retrieved Exact 0.3716