Blog Track results, polarity task — Dublin City University

Summary Statistics Run ID: DCUCDVPgpo.positive Corresponding baseline: baseline4 Topic fields used title, description Document fields used permalinks Number of Topics: 149 Total number of documents over all topics Retrieved: 149000 Relevant and contains an opinion: 10457 Relevant opinion documents retrieved: 7719

Recall Level Averages Recall Precision 0.00 0.4557 0.10 0.2989 0.20 0.2546 0.30 0.2207 0.40 0.2008 0.50 0.1808 0.60 0.1517 0.70 0.1244 0.80 0.0923 0.90 0.0605 1.00 0.0274 Mean average precision non-interpolated 0.1688

Document Level Averages Precision At 5 docs 0.2107 At 10 docs 0.2201 At 15 docs 0.2174 At 20 docs 0.2195 At 30 docs 0.2136 At 100 docs 0.1665 At 200 docs 0.1330 At 500 docs 0.0844 At 1000 docs 0.0518 R-Precision: precision after R (number relevant) documents retrieved Exact 0.1930