hit - Heilongjiang Institute of Technology - trec07p (immediate) Corpus

hitir1pf hitir2pf Gold Std.

Filter Classification ham spam ham 25210 325 spam 10 49874 ham spam ham 25210 301 spam 10 49898

Ham Misc% 0.04 (0.02-0.07) 0.04 (0.02-0.07) Spam Misc% 0.65 (0.58-0.72) 0.60 (0.53-0.67) Logit av Misc% 0.16 (0.12 - 0.22) 0.15 (0.11 - 0.22)

(1-ROCA)% 0.0652 (0.0463 - 0.0919) 0.0644 (0.0461 - 0.0900)

Ham Misc% Spam Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

81.33 (11.43 - 99.32) 20.82 (0.27 - 96.18) 0.34 (0.09 - 1.24) 0.21 (0.15 - 0.29) 0.14 (0.10 - 0.18) 0.10 (0.08 - 0.13) 0.10 (0.07 - 0.13) 0.09 (0.07 - 0.13) 0.08 (0.06 - 0.11) 0.07 (0.05 - 0.10) 0.06 (0.04 - 0.08) 0.05 (0.03 - 0.07)

76.08 (21.20 - 97.41) 23.58 (0.47 - 95.24) 0.32 (0.10 - 1.08) 0.21 (0.16 - 0.27) 0.14 (0.11 - 0.18) 0.10 (0.08 - 0.14) 0.10 (0.07 - 0.13) 0.09 (0.07 - 0.13) 0.08 (0.06 - 0.11) 0.07 (0.05 - 0.10) 0.06 (0.04 - 0.08) 0.05 (0.03 - 0.07)

Spam Misc% Ham Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

96.70 (nan - nan) 95.91 (94.70 - 96.85) 31.52 (1.94 - 91.48) 0.53 (0.07 - 4.03) 0.10 (0.06 - 0.17) 0.04 (0.02 - 0.08) 0.04 (0.02 - 0.08) 0.02 (0.01 - 0.07) 0.02 (0.01 - 0.07) 0.02 (0.01 - 0.07) 0.02 (0.01 - 0.07) 0.02 (0.00 - 0.06)

96.64 (nan - nan) 95.61 (94.08 - 96.76) 29.61 (1.52 - 91.99) 0.53 (0.06 - 4.42) 0.11 (0.07 - 0.17) 0.04 (0.02 - 0.08) 0.03 (0.02 - 0.07) 0.03 (0.01 - 0.06) 0.02 (0.01 - 0.06) 0.02 (0.01 - 0.06) 0.02 (0.01 - 0.06) 0.02 (0.01 - 0.05)

ROC Curves

Cumulative ROC Areas