fdw - Fudan University-WIM Lab - trec07p (active) Corpus

fdw1p1000 fdw2p1000 fdw3p1000 fdw4p1000 Gold Std.

Filter Classification ham spam ham 24988 393 spam 232 49806 ham spam ham 24973 341 spam 247 49858 ham spam ham 24777 101 spam 443 50098 ham spam ham 23251 95 spam 1969 50104

Ham Misc% 0.92 (0.81-1.05) 0.98 (0.86-1.11) 1.76 (1.60-1.93) 7.81 (7.48-8.15) Spam Misc% 0.78 (0.71-0.86) 0.68 (0.61-0.76) 0.20 (0.16-0.24) 0.19 (0.15-0.23) Logit av Misc% 0.85 (0.79 - 0.92) 0.82 (0.75 - 0.89) 0.60 (0.53 - 0.67) 1.25 (1.12 - 1.40)

(1-ROCA)% 0.0641 (0.0518 - 0.0793) 0.0881 (0.0753 - 0.1031) 0.1629 (0.1386 - 0.1914) 0.2029 (0.1820 - 0.2262)

Ham Misc% Spam Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

44.41 (11.62 - 82.92) 28.53 (16.40 - 44.82) 20.28 (14.12 - 28.24) 13.05 (9.20 - 18.18) 8.23 (6.11 - 11.00) 2.23 (1.48 - 3.33) 0.69 (0.57 - 0.84) 0.19 (0.15 - 0.26) 0.02 (0.01 - 0.04) 0.01 (0.00 - 0.02) 0.00 (0.00 - 0.01) 0.00 (0.00 - 0.00)

47.56 (21.18 - 75.38) 27.14 (15.18 - 43.67) 16.43 (11.60 - 22.77) 13.40 (11.69 - 15.31) 10.40 (9.32 - 11.60) 6.82 (6.43 - 7.23) 0.64 (0.42 - 0.98) 0.12 (0.09 - 0.16) 0.05 (0.03 - 0.08) 0.01 (0.00 - 0.03) 0.00 (0.00 - 0.01) 0.00 (0.00 - 0.00)

58.36 (53.18 - 63.36) 56.54 (51.57 - 61.38) 48.87 (39.66 - 58.16) 33.31 (25.02 - 42.79) 24.19 (18.94 - 30.35) 9.84 (8.30 - 11.63) 3.10 (2.36 - 4.07) 0.16 (0.13 - 0.21) 0.05 (0.03 - 0.08) 0.02 (0.01 - 0.04) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.01)

48.88 (16.56 - 82.17) 40.50 (24.47 - 58.85) 30.19 (23.98 - 37.21) 21.63 (17.06 - 27.02) 13.38 (11.67 - 15.29) 9.87 (9.23 - 10.54) 7.85 (7.49 - 8.22) 1.53 (1.39 - 1.68) 0.37 (0.31 - 0.45) 0.12 (0.09 - 0.16) 0.02 (0.01 - 0.05) 0.00 (0.00 - 0.00)

Spam Misc% Ham Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

7.07 (4.48 - 10.96) 5.03 (3.63 - 6.92) 3.89 (3.40 - 4.45) 2.95 (2.59 - 3.35) 1.93 (1.70 - 2.20) 1.16 (1.04 - 1.29) 0.81 (0.71 - 0.93) 0.53 (0.45 - 0.61) 0.31 (0.25 - 0.39) 0.15 (0.11 - 0.20) 0.05 (0.03 - 0.10) 0.00 (0.00 - 0.01)

8.45 (4.67 - 14.84) 8.09 (6.37 - 10.23) 4.44 (3.09 - 6.35) 2.50 (1.57 - 3.95) 1.36 (1.16 - 1.59) 1.07 (0.95 - 1.21) 0.86 (0.76 - 0.98) 0.84 (0.74 - 0.96) 0.79 (0.69 - 0.90) 0.23 (0.17 - 0.30) 0.04 (0.02 - 0.09) 0.00 (0.00 - 0.01)

11.30 (7.73 - 16.24) 9.00 (6.01 - 13.27) 4.93 (3.24 - 7.45) 2.54 (2.11 - 3.06) 1.76 (1.53 - 2.02) 1.38 (1.24 - 1.53) 1.28 (1.15 - 1.42) 1.23 (1.10 - 1.38) 0.77 (0.68 - 0.88) 0.48 (0.41 - 0.57) 0.24 (0.18 - 0.32) 0.04 (0.02 - 0.07)

21.89 (20.12 - 23.77) 20.40 (18.78 - 22.12) 16.19 (13.29 - 19.59) 11.02 (9.65 - 12.56) 7.74 (7.01 - 8.54) 4.36 (3.98 - 4.77) 2.95 (2.72 - 3.19) 1.38 (1.25 - 1.51) 1.24 (1.12 - 1.37) 0.48 (0.39 - 0.58) 0.11 (0.07 - 0.17) 0.01 (0.00 - 0.04)

ROC Curves

Cumulative ROC Areas