QA track, main task results — Queens College, CUNY

Run ID pircs07qa3 Factoid accuracy: 0.128 Average F score for list questions: 0.094 Average F score (β = 3) for Other questions: 0.001 Average per-series combined score: 0.073

Factoid Counts # globally correct 46 # locally correct 5 # inexact 21 # unsupported 8 # wrong 280 NIL response never returned