QA track, ciQA final task results — University of North Carolina

Run ID: UNCYAEX2 Run Description: Automatic, final run Corresponding baseline run: UNCYABL30 Interaction ID: UNCYA1 Average Pyramid F score (β = 3): 0.374 Mean Average Nugget Recall: 0.3589

Nugget Recall At Length Recall 100 0.0078 200 0.0788 500 0.1734 1000 0.2714 1500 0.3324 2000 0.3872 2500 0.4371 3000 0.4698 4000 0.5073