QA track, ciQA final task results — University of Massachusetts

Run ID: UMassIntA Run Description: Automatic, final run Corresponding baseline run: UMassBaseAut Interaction ID: UMass2 Average Pyramid F score (β = 3): 0.347 Mean Average Nugget Recall: 0.2972

Nugget Recall At Length Recall 100 0.0258 200 0.0662 500 0.1885 1000 0.2542 1500 0.3142 2000 0.3455 2500 0.3520 3000 0.3553 4000 0.3618