QA track, main task results — Tsinghua University (State Key Lab)

Run ID QUANTA Factoid accuracy: 0.206 Average F score for list questions: 0.086 Average F score (β = 3) for Other questions: 0.194 Average per-series combined score: 0.160

Factoid Counts # globally correct 74 # locally correct 2 # inexact 15 # unsupported 70 # wrong 199 NIL precision 1 / 11 = 0.091 NIL recall 1 / 16 = 0.062