QA track, ciQA baseline task results — Michigan State University

Run ID: MSUciQAiHeu Run Description: Automatic, baseline run Average Pyramid F score (β = 3): 0.359 Mean Average Nugget Recall: 0.3453

Nugget Recall At Length Recall 100 0.0081 200 0.0530 500 0.1514 1000 0.2809 1500 0.3322 2000 0.3949 2500 0.4189 3000 0.4425 4000 0.4831