QA track, ciQA final task results — Michigan State University

Run ID: MSUciQAfInt Run Description: Automatic, final run Corresponding baseline run: MSUciQAiHeu Interaction ID: MSUINT Average Pyramid F score (β = 3): 0.370 Mean Average Nugget Recall: 0.3665

Nugget Recall At Length Recall 100 0.0134 200 0.0569 500 0.1727 1000 0.2788 1500 0.3408 2000 0.4186 2500 0.4374 3000 0.4744 4000 0.5017