QA track, main task results — EffectiveSoft Ltd

Run ID Intellexer7B Factoid accuracy: 0.100 Average F score for list questions: 0.038 Average F score (β = 3) for Other questions: 0.090 Average per-series combined score: 0.077

Factoid Counts # globally correct 36 # locally correct 2 # inexact 10 # unsupported 2 # wrong 310 NIL precision 7 /151 = 0.046 NIL recall 7 / 16 = 0.438