QA track, main task results — State University of New York (SUNY) at Albany

Run ID ILQUA2 Factoid accuracy: 0.222 Average F score for list questions: 0.144 Average F score (β = 3) for Other questions: 0.216 Average per-series combined score: 0.193

Factoid Counts # globally correct 80 # locally correct 6 # inexact 13 # unsupported 7 # wrong 254 NIL precision 0 / 22 = 0.000 NIL recall 0 / 16 = 0.000