QA track, main task results — Indian Institute Of Technology, Delhi

Run ID IITDIBM2007T Factoid accuracy: 0.183 Average F score for list questions: 0.125 Average F score (β = 3) for Other questions: 0.208 Average per-series combined score: 0.174

Factoid Counts # globally correct 66 # locally correct 7 # inexact 22 # unsupported 3 # wrong 262 NIL precision 2 / 6 = 0.333 NIL recall 2 / 16 = 0.125