Genomics Track results — York University

york07ga3 Run type automatic Document MAP 0.19165312 Passage MAP 0.05953786 Passage2 MAP 0.02267935 Aspect MAP 0.06112168

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: