Genomics Track results — University of Maryland, College Park (Oard)

ncbi2007a Run type automatic Document MAP 0.22219393 Passage MAP 0.05492251 Passage2 MAP 0.06122859 Aspect MAP 0.20216186

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: