Genomics Track results — Illinois Institute of Technology

iitx1r2 Run type automatic Document MAP 0.24540196 Passage MAP 0.08524783 Passage2 MAP 0.03883777 Aspect MAP 0.12724419

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: