Genomics Track results — University of Illinois at Urbana-Champaign (Zhai)

UIUCconj Run type automatic Document MAP 0.14948100 Passage MAP 0.04967581 Passage2 MAP 0.02955951 Aspect MAP 0.13019662

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: