Genomics Track results — National Library of Medicine (NLM)

NLMinter Run type interactive Document MAP 0.32862429 Passage MAP 0.09682213 Passage2 MAP 0.11479563 Aspect MAP 0.26305046

Plots of the per-topic difference from median average precision among manual and interactive runs for given granularity/measure: