Genomics Track results — National Library of Medicine (NLM)

LHNCBC Run type automatic Document MAP 0.22657818 Passage MAP 0.06092340 Passage2 MAP 0.06799077 Aspect MAP 0.20297776

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: