Genomics Track results — European Bioinformatics Institute

EBI1Lucene Run type automatic Document MAP 0.17991342 Passage MAP 0.04196432 Passage2 MAP 0.04038423 Aspect MAP 0.15131579

Plots of the per-topic difference from median average precision among automatic runs for given granularity/measure: