Blog Track results, polarity subtask — University at Buffalo, The state University of New York

Summary Statistics Run ID: pUB11 Corresponding opinion run: UB1 Total number of documents over all topics Opinion documents: 7000 Negative: 1844 Mixed: 2196 Positive: 2960 Opinion documents retrieved: 2818 Correctly classified: 646 Correctly classified negative: 17 Correctly classified mixed: 612 Correctly classified positive: 17

Document Level Averages Fraction correctly classified At 5 docs 0.1120 At 10 docs 0.1000 At 15 docs 0.1040 At 20 docs 0.0960 At 30 docs 0.0867 At 100 docs 0.0630 At 200 docs 0.0540 At 500 docs 0.0350 At 1000 docs 0.0195 R-accuracy (fraction correctly classified after R (number of opinion) documents retrieved Exact 0.0671