Blog Track results, opinion search task — University of Neuchatel

Summary Statistics Run ID: UniNEblog2 Topic fields used title, description, narrative Document fields used permalinks Number of Topics: 50 Total number of documents over all topics Retrieved: 50000 Relevant and contains an opinion: 7000 Relevant opinion documents retrieved: 4871

Recall Level Averages Recall Precision 0.00 0.7445 0.10 0.5459 0.20 0.4555 0.30 0.4069 0.40 0.3696 0.50 0.3301 0.60 0.2305 0.70 0.1752 0.80 0.1090 0.90 0.0516 1.00 0.0180 Mean average precision non-interpolated 0.2898

Document Level Averages Precision At 5 docs 0.5360 At 10 docs 0.5020 At 15 docs 0.4600 At 20 docs 0.4520 At 30 docs 0.4167 At 100 docs 0.3114 At 200 docs 0.2464 At 500 docs 0.1536 At 1000 docs 0.0974 R-Precision: precision after R (number relevant) documents retrieved Exact 0.3385