Terabyte Track results, adhoc search task — Universit degli Studi di Milano

mg4jAutoBV Run Type automatic Fields Used title Links/Anchor text/Structure used anchor text, doc struct Number of Topics: 50 Total number of documents over all topics Retrieved: 490606 Relevant: 5893 Rel-ret: 5264 Inferred Average Precision, topics 801-850 0.2837 Mean Average Precision, topics 801-850 0.3061 Mean Average Precision, topics 701-850 (auto runs only) 0.2914 % of collection indexed 100% Number of CPUs 4 Indexing time 900 min. System RAM 4 GB Avg. time to retr. top 20 20 sec. Approx. system cost $4000 Total wall-clock time 3000 sec. Year of purchase 2006 Total CPU time 2600 sec. Operating system Linux Size of on-disk structures 31 GB

Recall Level Averages Recall Precision 0.00 0.7546 0.10 0.5434 0.20 0.4783 0.30 0.4195 0.40 0.3689 0.50 0.3037 0.60 0.2458 0.70 0.2090 0.80 0.1636 0.90 0.1061 1.00 0.0304

Document Level Averages Precision At 5 docs 0.5080 At 10 docs 0.4900 At 15 docs 0.4627 At 20 docs 0.4550 At 30 docs 0.4453 At 100 docs 0.3394 At 200 docs 0.2610 At 500 docs 0.1425 At 1000 docs 0.0817