Terabyte Track results, named-page finding task — Chinese Academy of Sciences (ICT)

icttb0600 all runs are automatic title-only Web features doc struct Number of topics: 181 % of collection indexed 100% Indexing time 820 min. Avg. time to retrieve top 20 2.59 sec. Total wall-clock time 427 sec. Total CPU time 469 sec. Size of on-disk structures 46 GB Number of CPUs 1 System RAM 4 GB Year of system purchase 2006 Approx. system cost $3000

Operating system SUSE Linux

Mean reciprocal rank 0.332 Topics with target at rank 1 48 Topics with target in top 10 81 Topics with no target found 52