Terabyte Track results, adhoc search task — Peking University, China (Yan)

TWTB06AD03 Run Type manual Fields Used Links/Anchor text/Structure used none Number of Topics: 50 Total number of documents over all topics Retrieved: 500000 Relevant: 5893 Rel-ret: 5259 Inferred Average Precision, topics 801-850 0.2550 Mean Average Precision, topics 801-850 0.3033 % of collection indexed 100% Number of CPUs 4 Indexing time 1515 min. System RAM 4 GB Avg. time to retr. top 20 14 sec. Approx. system cost $5600 Total wall-clock time 723 sec. Year of purchase 2005 Total CPU time 723 sec. Operating system Linux Size of on-disk structures 202 GB

Recall Level Averages Recall Precision 0.00 0.8276 0.10 0.6110 0.20 0.4985 0.30 0.4216 0.40 0.3694 0.50 0.3028 0.60 0.2264 0.70 0.1656 0.80 0.1111 0.90 0.0613 1.00 0.0131

Document Level Averages Precision At 5 docs 0.5720 At 10 docs 0.5340 At 15 docs 0.5147 At 20 docs 0.5110 At 30 docs 0.4760 At 100 docs 0.3336 At 200 docs 0.2404 At 500 docs 0.1376 At 1000 docs 0.0810