tuf - Tufts Univ. - Public Chinese Corpus

tufS1pci tufS2pci Gold Std.

Filter Classification ham spam ham 21742 22 spam 24 42832 ham spam ham 21744 21 spam 22 42833

Ham Misc% 0.11 (0.07-0.16) 0.10 (0.06-0.15) Spam Misc% 0.05 (0.03-0.08) 0.05 (0.03-0.07) Logit av Misc% 0.08 (0.05 - 0.10) 0.07 (0.05 - 0.10)

(1-ROCA)% 0.0023 (0.0006 - 0.0083) 0.0031 (0.0009 - 0.0106)

Ham Misc% Spam Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

0.63 (0.38 - 1.05) 0.57 (0.29 - 1.10) 0.23 (0.10 - 0.54) 0.07 (0.03 - 0.17) 0.03 (0.02 - 0.06) 0.01 (0.01 - 0.04) 0.01 (0.00 - 0.03) 0.01 (0.00 - 0.02) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.01)

0.90 (0.27 - 2.90) 0.32 (0.10 - 1.00) 0.14 (0.07 - 0.30) 0.05 (0.02 - 0.15) 0.03 (0.01 - 0.05) 0.01 (0.00 - 0.03) 0.01 (0.00 - 0.04) 0.01 (0.00 - 0.03) 0.01 (0.00 - 0.03) 0.01 (0.00 - 0.03) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.01)

Spam Misc% Ham Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

0.62 (0.06 - 6.33) 0.33 (0.12 - 0.88) 0.11 (0.06 - 0.19) 0.07 (0.04 - 0.13) 0.05 (0.03 - 0.09) 0.02 (0.01 - 0.06) 0.00 (0.00 - 0.02) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00)

1.09 (0.06 - 17.89) 0.32 (0.11 - 0.94) 0.10 (0.06 - 0.17) 0.07 (0.04 - 0.14) 0.04 (0.02 - 0.08) 0.02 (0.01 - 0.06) 0.01 (0.00 - 0.04) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00) 0.00 (0.00 - 0.00)

ROC Curves

Cumulative ROC Areas