ijs - Jozef Stefan Institute (Bratko) - MrX II (delayed feedback) Corpus

ijsS1x2d Gold Std.

Filter Classification ham spam ham 8957 196 spam 82 39939

Ham Misc% 0.91 (0.72-1.12) Spam Misc% 0.49 (0.42-0.56) Logit av Misc% 0.67 (0.59 - 0.75)

(1-ROCA)% 0.0633 (0.0423 - 0.0947)

Ham Misc% Spam Misc% 0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

73.59 (44.80 - 90.54) 45.48 (16.77 - 77.54) 28.89 (5.65 - 73.36) 4.78 (1.26 - 16.50) 1.75 (0.88 - 3.46) 0.72 (0.59 - 0.88) 0.48 (0.41 - 0.55) 0.24 (0.18 - 0.32) 0.10 (0.07 - 0.13) 0.05 (0.03 - 0.08) 0.03 (0.02 - 0.05) 0.01 (0.01 - 0.04)

Spam Misc% Ham Misc% 0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

63.13 (16.05 - 93.88) 24.48 (7.42 - 56.73) 10.14 (6.63 - 15.22) 4.98 (3.76 - 6.56) 2.22 (1.73 - 2.85) 0.87 (0.59 - 1.29) 0.32 (0.22 - 0.48) 0.20 (0.12 - 0.33) 0.10 (0.05 - 0.20) 0.08 (0.03 - 0.18) 0.06 (0.02 - 0.13) 0.01 (0.00 - 0.04)

ROC Curves

Cumulative ROC Areas