dal - Dalhousie University - SB II Corpus

dalS1b2 dalS2b2 dalS3b2 dalS4b2 Gold Std.

Filter Classification ham spam ham 8707 496 spam 567 2255 ham spam ham 34 0 spam 9240 2751 ham spam ham 681 1 spam 8593 2750 ham spam ham 6051 13 spam 3223 2738

Ham Misc% 6.11 (5.63-6.62) 99.63 (99.49-99.75) 92.66 (92.11-93.18) 34.75 (33.78-35.73) Spam Misc% 18.03 (16.61-19.52) 0.00 (0.00-0.11) 0.04 (0.00-0.20) 0.47 (0.25-0.81) Logit av Misc% 10.69 (10.05 - 11.36) 0.00 (nan - nan) 6.34 (nan - nan) 4.79 (3.61 - 6.33)

(1-ROCA)% 4.1620 (3.8215 - 4.5313) 6.9847 (6.5565 - 7.4386) 4.6356 (4.2877 - 5.0101) 17.4061 (16.7403 - 18.0927)

Ham Misc% Spam Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

85.35 (83.32 - 87.17) 84.81 (82.45 - 86.89) 82.88 (80.87 - 84.72) 81.61 (78.16 - 84.62) 77.39 (73.62 - 80.77) 71.61 (68.47 - 74.55) 63.29 (59.14 - 67.24) 48.60 (44.51 - 52.71) 22.65 (20.19 - 25.31) 10.40 (8.89 - 12.13) 3.34 (2.71 - 4.11) 0.51 (0.29 - 0.88)

92.00 (89.37 - 94.02) 90.11 (86.63 - 92.77) 87.71 (83.70 - 90.84) 82.48 (77.19 - 86.76) 79.72 (77.05 - 82.14) 70.96 (67.35 - 74.31) 64.23 (61.02 - 67.32) 55.43 (52.64 - 58.19) 40.57 (37.68 - 43.52) 24.90 (23.01 - 26.89) 9.81 (8.60 - 11.17) 0.62 (0.40 - 0.95)

99.13 (92.70 - 99.90) 93.13 (61.64 - 99.13) 89.39 (78.96 - 94.97) 84.77 (78.43 - 89.50) 80.08 (74.75 - 84.52) 67.07 (63.41 - 70.53) 57.62 (54.49 - 60.68) 41.98 (38.03 - 46.05) 24.90 (22.92 - 26.99) 14.07 (12.73 - 15.52) 4.91 (4.08 - 5.89) 0.76 (0.50 - 1.16)

100.00 (nan - nan) 100.00 (nan - nan) 99.85 (nan - nan) 99.75 (99.38 - 99.90) 99.31 (98.62 - 99.66) 98.51 (97.68 - 99.04) 96.84 (95.67 - 97.70) 94.44 (93.14 - 95.50) 85.17 (83.18 - 86.96) 70.81 (68.51 - 73.01) 41.48 (38.77 - 44.24) 0.33 (0.16 - 0.67)

Spam Misc% Ham Misc%

0.01 0.02 0.05 0.10 0.20 0.50 1.00 2.00 5.00 10.00 20.00 50.00

100.00 (nan - nan) 98.38 (92.62 - 99.66) 93.12 (72.52 - 98.58) 92.83 (75.80 - 98.17) 80.70 (59.15 - 92.35) 54.02 (36.28 - 70.80) 37.84 (28.75 - 47.86) 25.07 (21.98 - 28.43) 16.21 (14.59 - 17.96) 10.14 (9.13 - 11.23) 5.69 (5.13 - 6.32) 1.87 (1.57 - 2.22)

100.00 (nan - nan) 98.05 (90.97 - 99.60) 92.30 (72.36 - 98.21) 91.27 (76.82 - 97.05) 82.52 (66.25 - 91.91) 64.69 (47.35 - 78.86) 43.72 (39.99 - 47.53) 32.01 (29.26 - 34.90) 25.50 (23.74 - 27.35) 19.60 (18.40 - 20.86) 12.29 (11.33 - 13.33) 2.97 (2.42 - 3.63)

100.00 (nan - nan) 95.89 (85.19 - 98.95) 86.68 (57.99 - 96.84) 78.81 (56.55 - 91.40) 72.44 (63.63 - 79.79) 62.06 (52.63 - 70.65) 43.51 (33.84 - 53.69) 29.69 (26.01 - 33.65) 19.59 (17.57 - 21.78) 13.03 (11.89 - 14.26) 6.94 (6.27 - 7.69) 1.48 (1.23 - 1.78)

100.00 (nan - nan) 94.31 (67.84 - 99.24) 90.52 (66.21 - 97.90) 80.89 (51.50 - 94.41) 65.65 (36.96 - 86.16) 34.75 (23.70 - 47.74) 34.49 (33.55 - 35.46) 34.07 (33.12 - 35.04) 33.02 (32.11 - 33.94) 31.45 (30.52 - 32.41) 27.93 (27.01 - 28.87) 17.21 (16.29 - 18.17)

ROC Curves

Cumulative ROC Areas