QA track, main task results — University of Washington (UW CLMA group)

Run ID uwclma Average per-series score: 0.104 Factoid accuracy: 0.112 Average F for list questions: 0.046 Average F(β = 3) other score: 0.153 Average F(β = 3) Pyramid other score: 0.165

Factoid Counts # globally correct 45 # locally correct 1 # inexact 20 # unsupported 7 # wrong 330 NIL response never returned