QA track, main task results — LexiClone Inc.

Run ID lexiclone06 Average per-series score: 0.046 Factoid accuracy: 0.139 Average F for list questions: 0.002 Average F(β = 3) other score: 0.000 Average F(β = 3) Pyramid other score: 0.000

Factoid Counts # globally correct 56 # locally correct 1 # inexact 10 # unsupported 1 # wrong 335 NIL response never returned