QA track, ciQA final task results — Massachusetts Institute of Technology (MIT)

Run ID csailif1 Run Description: Automatic, final run Corresponding baseline run: csail1 Interaction form: csaili1 Average F(β = 3) Pyramid score: 0.209 MANuR: 0.1781

Weighted Nugget Recall At Length Recall 100 0.0000 200 0.0376 500 0.0971 1000 0.1409 1500 0.1637 2000 0.1869 2500 0.2207 3000 0.2315 4000 0.2412