QA track, main task results — Tokyo Institute of Technology

Run ID asked06b Average per-series score: 0.116 Factoid accuracy: 0.236 Average F for list questions: 0.074 Average F(β = 3) other score: 0.042 Average F(β = 3) Pyramid other score: 0.062

Factoid Counts # globally correct 95 # locally correct 2 # inexact 27 # unsupported 22 # wrong 257 NIL response never returned