QA track, ciQA baseline task results — University of Waterloo

Run ID UWATCIQA1 Run Description: Automatic, baseline run Average F(β = 3) Pyramid score: 0.247 MANuR: 0.1792

Weighted Nugget Recall At Length Recall 100 0.0000 200 0.0249 500 0.0770 1000 0.1249 1500 0.1572 2000 0.1755 2500 0.2178 3000 0.2391 4000 0.2908