QA track, ciQA baseline task results — University of Maryland (College Park)

Run ID UMDM1pre Run Description: Manual baseline run Average F(β = 3) Pyramid score: 0.316 MANuR: 0.3155

Weighted Nugget Recall At Length Recall 100 0.0000 200 0.0564 500 0.1443 1000 0.2556 1500 0.3366 2000 0.3590 2500 0.3790 3000 0.3876 4000 0.4186