QA track, ciQA baseline task results — University of Maryland (College Park)

Run ID UMDA1pre Run Description: Automatic, baseline run Average F(β = 3) Pyramid score: 0.224 MANuR: 0.1439

Weighted Nugget Recall At Length Recall 100 0.0000 200 0.0320 500 0.0557 1000 0.1010 1500 0.1295 2000 0.1509 2500 0.1696 3000 0.1849 4000 0.2257