QA track, ciQA baseline task results — University of Massachusetts (Allan)

Run ID UMASSauto2 Run Description: Automatic, baseline run Average F(β = 3) Pyramid score: 0.171 MANuR: 0.1390

Weighted Nugget Recall At Length Recall 100 0.0057 200 0.0288 500 0.0534 1000 0.1045 1500 0.1227 2000 0.1430 2500 0.1638 3000 0.1868 4000 0.2188