QA track, main task results — National University of Singapore

Run ID NUSCHUAQA1 Average per-series score: 0.181 Factoid accuracy: 0.261 Average F for list questions: 0.171 Average F(β = 3) other score: 0.120 Average F(β = 3) Pyramid other score: 0.130

Factoid Counts # globally correct 105 # locally correct 2 # inexact 35 # unsupported 14 # wrong 247 NIL precision 0 / 16 = 0.000 NIL recall 0 / 17 = 0.000